S3Tray Plus 任务栏实用程序

要了解如何使用帮助，请按 F1。

S3Tray Plus 是有一个任务栏图标，可以帮助您非常方便地从一个中心位置访问 S3 Graphics 实用程序。此外，S3Tray Plus 还提供一些有用的其它显示功能，如更改刷新率或显示模式。如需 S3Tray Plus 中各项功能的更多信息，请使用下面的列表。

更改屏幕大小和颜色数

启用/禁用 S3Desk Toys

更改 S3Tray Plus 中的选项

访问显示属性

访问其它 S3 Graphics 实用程序


更改刷新率

利用菜单中的刷新率项目，您可以方便地更改任何屏幕大小和颜色数的刷新率。这将打开刷新对话框，它包含三个主要部分。

监视器 � 此下拉列表显示多监视器系统可以使用的监视器。如果不启用多监视器，此列表将灰显并且默认值为监视器 1。

显示模式 � 此列表显示所选监视器可以使用的显示模式。对于每种显示模式，还会显示当前刷新率。


启用/禁用 S3Desk Toys

S3DeskToys 是一个窗口和桌面管理实用程序，用于控制窗口和对话框在多监视器配置情况下的运行方式，并为不支持多监视器的系统提供虚拟桌面。此外，还可以为系统增加一些调整功能和特殊效果。简而言之，它具有以下功能：

桌面管理 � 利用 S3DeskToys，您可以管理多监视器环境中的窗口和对话框。可以控制窗口是最大化到当前监视器、特定监视器还是所有监视器。此外，您可以决定对话框是在当前监视器、特定监视器还是所有监视器上居中。

虚拟桌面 � S3DeskToys 还提供虚拟桌面，以拓展您的工作空间。每个虚拟桌面可以拥有自己的背景、墙纸以及应用程序和窗口等一套设置。您可以方便地切换不同的虚拟桌面，将应用程序从一个桌面移到另一个桌面。此外，您还可以指定特定的应用程序显示在所有虚拟桌面上。

特殊效果 � 您可以让特定窗口在被拖动时或者变成不活动状态时变得半透明。可以控制半透明程度。这些功能仅在 Windows 2000、Windows XP 或更高版本中有效。

任务栏锁定 � 在 Windows 95/98/ME 和 Windows 2000 中，您可以锁定任务栏以防止意外调整任务栏的大小或移动其位置。


更改 S3Tray Plus 选项

您可以根据自己的喜好调整 S3Tray Plus 的工作方式。可用的选项包括：

显示用于更改显示模式的菜单

在应用新设置前重新启动

应用新设置而不需用户确认

应用新设置时需要用户确认

在菜单上显示实用程序

显示实用程序所添加的菜单项

显示风趣菜单

在菜单上显示横幅

在 Windows 启动时加载


访问显示属性

使用菜单中的“调整显示属性”项目，您可以迅速打开显示属性并转到设置页。


访问其它 S3 Graphics 实用程序

使用菜单中的实用程序项目，您可以跳过显示属性屏幕而直接访问 S3 Graphics 实用程序。此菜单中会列出兼容的 S3 Graphics 实用程序和一个附加条目“所有实用程序”。

选择一个实用程序后，可以立即打开该实用程序的属性页。实用程序的运行方式与您在显示属性中通常看到的几乎完全一样，但是访问时非常方便和快捷。

选择“所有实用程序”时，会弹出一个组合的属性页，所有 S3 Graphics 实用程序按选项卡分成多个组。


显示模式是可以使用的屏幕大小和颜色数的组合。


显示此实用程序的版本。


单击此项可以打开本产品的网页。


显示 OEM 或产品徽标。


监视器：显示您的系统可以使用的监视器。如果未启用多监视器，此列表将灰显。从此列表中选择一个监视器时，将显示该监视器可以使用的刷新率。


显示模式：显示所选监视器可以使用的显示模式，以及每种模式的当前刷新率。选择一种显示模式时，可以显示刷新率列表以更改该模式的刷新率。


刷新率列表：当选择一种显示模式时，会出现刷新率列表。可以使用此列表为所选模式选择新的刷新率。


测试：单击此项可以在保存任何更改之前，测试所选的显示模式和刷新率。S3Tray Plus 将显示更改至新的模式和刷新率并等待 15 秒，让您确认更改是否成功。如果您回答否（按键盘上的 N 或 ESC），S3Tray Plus 将立即恢复显示至原来的设置。


显示监视器设置菜单，以便迅速更改屏幕大小和颜色数。


指定当更改系统显示设置时，您希望计算机自动重新启动。


指定当更改系统颜色设置时，您希望计算机自动重新启动。


指定在应用对系统显示设置的更改时，您不希望重新启动。

如果更改后不重新启动，一些程序可能无法正确显示颜色。为避免此问题，请关闭程序，更改设置，然后重新打开程序。


指定在应用对系统颜色设置的更改时，您不希望重新启动。

如果更改后不重新启动，一些程序可能无法正确显示颜色。为避免此问题，请关闭程序，更改颜色设置，然后重新打开程序。


指定在每次更改显示设置时，S3Tray Plus 是否显示一个提示让您确认。


指定 S3Tray Plus 是否提供实用程序菜单以快速访问其它 S3 Graphics 实用程序。如果不选中此项，您仍可以访问显示属性或显示属性的高级设置页中的实用程序。


指定 S3Tray Plus 是否显示由其它 S3 Graphics 实用程序提供的更多菜单项。例如，显示切换实用程序可以提供用于打开或关闭各种显示的菜单项。


指定在 Windows 启动时是否加载 S3Tray Plus。


选中此项可以让任务栏图标显示一个图形化菜单，其中显示每个项目的图标。


选中此项可以在任务栏图标菜单的旁边显示一个横幅图形。只有在选中图标菜单时，才能使用此选项。


Added/Changed text needing localization


保存已作出的所有更改，而不关闭对话框。


指定在调用任务栏图标菜单时，实用程序必须在多长时间之后检查新设备连接。由于检查新设备可能使显示器闪烁，因此可以更改此设置，以减少检查新设备的频率。

如果加长此时间，将减少在调用任务栏图标菜单时所看到的屏幕闪烁，但是在某些情况下，可能无法检测到新连接的设备，这些设备将在菜单中禁用。如果缩短此时间，将更易于检测新连接的设备，但在您调用任务栏图标菜单时将导致更多的屏幕闪烁。

要在时间到达前强制检查新设备，请在单击该菜单任务栏图标的同时按住 Shift 键。要防止设备连接检查，请在单击该菜单任务栏图标的同时 Control 键。


更改屏幕尺寸和颜色数

从“显示模式”菜单中，可以方便地更改显示模式（对于多监视器系统为“显示 1 模式”、“显示 2 模式”等）。此菜单项显示可用的屏幕尺寸，它们按颜色数分组。每个可用的显示模式在菜单中都有各自的条目，其形式为“<宽> x <高> (<颜色数> bpp)”。例如，前几个模式通常是“640x480 (8bpp)”和“800x600 (8bpp)”。当前显示模式标有圆点。

要将显示更改为其它模式，只需选择具有所需屏幕尺寸和颜色数的模式。根据在“选项”屏幕中作出的选择，系统可能会首先要求您确认选择，在颜色数出现更改时，S3Tray Plus 可能会要求重新启动计算机。有关详细信息，请参见“更改选项”。


版权声明

� 版权所有 2004 S3 Graphics Co., Ltd. 保留所有权利。此处所含的信息是 S3 Graphics 的专有财产，未经 S3 Graphics 事先的书面许可，不得分发、复制或公开其全部或部分内容。如果以电子形式从 S3 Graphics 收到本文档，则可以为与 S3 Graphics 产品相关的商业用途制作以下副本：一个保存到计算机上供联机查看的副本和一个打印副本。就所有文档而言，无论是以硬拷贝还是电子形式接收，未经 S3 Graphics Co., Ltd., 1045 Mission Court, Fremont, CA 94539, USA 事先的书面许可，不得通过电子、机械、影印或其它任何手段使用、复制或存储全部或部分内容。S3 是 S3 Incorporated 的注册商标。AlphaChrome、DeltaChrome、DuoView、ProSavage、Savage、Savage4、SavageXP、Streams Processor、SuperSavage、Twister 和 UniChrome 是 S3 Graphics 的商标。本文档中引用的其它商标归其各自公司所有。本文档中的资料仅作信息参考，如有更改，恕不另行通知。S3 Graphics 保留在不作保留和不通知其用户的情况下更改产品设计的权利。